#
#	Definition file for flash symbol.
#
-0.4	-0.5	M
0.1	-0.05	D
0	-0.05	D
0.325	0.25	D
0.15	0.25	D
0.4	0.5	D
0.125	0.5	D
-0.15	0.15	D
0.025	0.15	D
-0.25	-0.15	D
-0.15	-0.15	D
